
\chapter{KEYSTICK\index{KEYSTICK}}


\section{Introduction}

%
\begin{figure}[h]
\begin{centering}
\includegraphics[width=0.8\textwidth]{gui/images/keystick}
\par\end{centering}

\caption{\label{fig:startmini}The Mini Graphical Interface}

\end{figure}


Keystick is a minimal text based interface. 


\section{Installing}

To use keystick change the DISPLAY ini file setting to:

{[}DISPLAY{]}

DISPLAY = keystick


\section{Using}

Keystick is very simple to use. In the MDI Mode you simply start typing
the g code and it shows up in the bottom text area. The {}``?''
key toggles help.
